CREATE TABLE `user_index` (
  `uid` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `openid` varchar(255) NOT NULL DEFAULT '' COMMENT '公众号openid'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='用户索引表';

CREATE TABLE `user_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `uid` int(11) NOT NULL DEFAULT '0' COMMENT '用户索引表id',
  `avator` varchar(255) NOT NULL DEFAULT '' COMMENT '头像',
  `nick` varchar(100) NOT NULL DEFAULT '' COMMENT '昵称',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='登录用户表';

CREATE TABLE `visitor_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `uid` int(11) NOT NULL DEFAULT '0' COMMENT '患者用户表id',
  `name` varchar(255) NOT NULL DEFAULT '' COMMENT '姓名',
  `idcard` char(100) NOT NULL DEFAULT '' COMMENT '身份证号',
  `phone` bigint(11) NOT NULL DEFAULT '0' COMMENT '手机号',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `status` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=正常 1=已删除'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='就诊用户人表';

CREATE TABLE `visit_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `visitor_id` int(11) NOT NULL DEFAULT '0' COMMENT '就诊用户人id',
  `visit_time` varchar(50) NOT NULL DEFAULT '' COMMENT '就诊预约时间 07:30-08:30',
  `visit_date` varchar(50) NOT NULL DEFAULT '' COMMENT '就诊预约日期 2024-03-01',
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `status` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=待叫号 1=就诊中 2=就诊完成 3=已过号',
  `start_time` timestamp NOT NULL DEFAULT '0000-00-00 00:00:00' COMMENT '计时开始时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='预约挂号表';

CREATE TABLE `visit_stat_info` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `visitor_id` int(11) NOT NULL DEFAULT '0' COMMENT '就诊用户人id',
  `last_visit` timestamp NOT NULL DEFAULT '0000-00-00 00:00:00' COMMENT '最后就诊时间',
  `total_num` int(11) NOT NULL DEFAULT '0' COMMENT '总针灸次数',
  `remain_num` int(11) NOT NULL DEFAULT '0' COMMENT '剩余针灸次数'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='患者就诊信息统计表';

CREATE TABLE `hospital_depart_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `hid` int(11) NOT NULL DEFAULT '0' COMMENT '医院id',
  `depart_name` int(11) NOT NULL DEFAULT '0' COMMENT '科室部门名称',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医院部门表';

CREATE TABLE `hospital_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `province` varchar(100) NOT NULL DEFAULT '' COMMENT '省',
  `cite` varchar(100) NOT NULL DEFAULT '' COMMENT '市',
  `h_name` varchar(255) NOT NULL DEFAULT '' COMMENT '医院名称',
  `short_name` varchar(255) NOT NULL DEFAULT '' COMMENT '医院简称',
  `h_pos` varchar(255) NOT NULL DEFAULT '' COMMENT '位置 腾讯地图坐标 例:纬度,经度(39.92536,116.45422)'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医院表';

CREATE TABLE `doctor_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `name` varchar(255) NOT NULL DEFAULT '' COMMENT '姓名',
  `phone` bigint(11) NOT NULL DEFAULT '0' COMMENT '手机号',
  `invite_code` char(128) NOT NULL DEFAULT '' COMMENT '邀请码',
  `desc` varchar(255) NOT NULL DEFAULT '' COMMENT '14字简介',
  `detail` text COMMENT '个人详细介绍',
  `openid` varchar(255) NOT NULL DEFAULT '' COMMENT '公众号openid',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '注册时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医生表';

CREATE TABLE `doctor_visit_info` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `doctor_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生id',
  `depart_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生科室id',
  `morning_worktime` char(50) NOT NULL DEFAULT '' COMMENT '上午上班时间-上午下班时间 9:00-12:00',
  `afternoon_worktime` char(50) NOT NULL DEFAULT '' COMMENT '下午上班时间-下午下班时间 14:00-17:30',
  `is_holiday_work` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=否 1=是 节假日是否停诊',
  `treat_num` int(4) NOT NULL DEFAULT '0' COMMENT '一次挂号针灸次数',
  `treat_time` int(4) NOT NULL DEFAULT '0' COMMENT '每次针灸时长',
  `bed_num` int(4) NOT NULL DEFAULT '0' COMMENT '可预约床位数',
  `treat_num_expire` int(4) NOT NULL DEFAULT '0' COMMENT '针灸次数有效期，单位天',
  `visit_hours` int(4) NOT NULL DEFAULT '0' COMMENT '距离当前可挂号最晚时间，单位小时,设置为2小时，用户可挂近两小时的号',
  `notice` text COMMENT '就诊提醒',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `status` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=就诊中 1=已停诊'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医生所在科室出诊信息表';
  
CREATE TABLE `doctor_helper_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `doctor_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生id',
  `hid` int(11) NOT NULL DEFAULT '0' COMMENT '医院id',
  `name` varchar(255) NOT NULL DEFAULT '' COMMENT '姓名',
  `idcard` varchar(100) NOT NULL DEFAULT '' COMMENT '身份证号',
  `phone` bigint(11) NOT NULL DEFAULT '0' COMMENT '手机号',
  `type` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=志愿者 1=助手',
  `status` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=待审核 1=审核通过 2=停用'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医生助手表';

CREATE TABLE `doctor_helper_auth` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `doctor_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生id',
  `type` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=志愿者 1=助手',
  `rule` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0=代患者预约 1=帮患者取证 2=挂号条录入 9 全部权限'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医生助手权限表';

CREATE TABLE `week_worktimes` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `week_day` tinyint(1) NOT NULL DEFAULT '0' COMMENT '1~7 代表周一到周天',
  `plan` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0 休息 1 上午上班 2 下午上班 3 全天出诊'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='每周出诊安排表';

CREATE TABLE `doctor_visit_change` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `morning_plan` tinyint(1) NOT NULL DEFAULT '0' COMMENT '上午计划 0=代表休息 1=自定义时间上班 2=自定义时间休息 3=默认时间',
  `morning_time` char(50) NOT NULL DEFAULT '' COMMENT '上午时间 9:00-12:00',
  `afternoon_plan` tinyint(1) NOT NULL DEFAULT '0' COMMENT '下午计划 0=代表休息 1=自定义时间上班 2=自定义时间休息 3=默认时间',
  `afternoon_time` char(50) NOT NULL DEFAULT '' COMMENT '下午时间 14:00-17:30',
  `date` date NOT NULL DEFAULT '0000-00-00' COMMENT '调诊日期'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='医生出诊临时调整表';

CREATE TABLE `everyday_visit_nums` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `date` date NOT NULL DEFAULT '0000-00-00' COMMENT '挂号日期',
  `times` char(50) NOT NULL DEFAULT '' COMMENT '挂号时间段 07:30-08:30',
  `num` int(5) NOT NULL DEFAULT '0' COMMENT '挂号数量',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '放号时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='每天挂号放号数量，放号表';

CREATE TABLE `opt_list` (
  `id` int NOT NULL AUTO_INCREMENT PRIMARY KEY,
  `dv_id` int(11) NOT NULL DEFAULT '0' COMMENT '医生所在科室出诊信息表id',
  `visitor_id` int(11) NOT NULL DEFAULT '0' COMMENT '就诊用户人id',
  `treat_nums` int(11) NOT NULL DEFAULT '0' COMMENT '针灸次数 挂号为正数 退号为负数',
  `type` tinyint(1) NOT NULL DEFAULT '0' COMMENT '0 ',
  `create` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '操作时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='挂号操作表';